<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">From 7e3c885d7447fa35c49a0f93e99d6c1a5d81c18e Mon Sep 17 00:00:00 2001
From: Laszlo Ersek &lt;lersek@redhat.com&gt;
Date: Tue, 8 Sep 2020 02:44:03 +0200
Subject: pc-bios: refresh edk2 build artifacts for edk2-stable202008
MIME-Version: 1.0
Content-Type: text/plain; charset=UTF-8
Content-Transfer-Encoding: 8bit

Rebuild the pc-bios/edk2-*.fd.bz2 binaries, based on the edk2-stable202008
release.

Cc: Philippe Mathieu-Daudé &lt;philmd@redhat.com&gt;
Ref: https://bugs.launchpad.net/qemu/+bug/1852196
Signed-off-by: Laszlo Ersek &lt;lersek@redhat.com&gt;
Reviewed-by: Philippe Mathieu-Daudé &lt;philmd@redhat.com&gt;
Tested-by: Philippe Mathieu-Daudé &lt;philmd@redhat.com&gt;
Message-Id: &lt;20200908072939.30178-10-lersek@redhat.com&gt;
Signed-off-by: Philippe Mathieu-Daudé &lt;philmd@redhat.com&gt;
---
 pc-bios/edk2-i386-secure-code.fd.bz2 | Bin 1943949 -&gt; 1860546 bytes
 1 file changed, 0 insertions(+), 0 deletions(-)

(limited to 'pc-bios/edk2-i386-secure-code.fd.bz2')

diff --git a/pc-bios/edk2-i386-secure-code.fd.bz2 b/pc-bios/edk2-i386-secure-code.fd.bz2
index df27bdd2dd..b5df5bed30 100644
Binary files a/pc-bios/edk2-i386-secure-code.fd.bz2 and b/pc-bios/edk2-i386-secure-code.fd.bz2 differ
-- 
cgit v1.2.3

</pre></body></html>