From 3891a5996fee2218bf3b53161af7ab35dbd1f070 Mon Sep 17 00:00:00 2001
From: Gerd Hoffmann <kraxel@redhat.com>
Date: Mon, 7 Mar 2022 16:11:43 +0100
Subject: edk2: update binaries to stable202202

The switch to edk2 RELEASE builds changes the memory layout a bit,
resulting in a acpi table change.

 DefinitionBlock ("", "SSDT", 1, "BOCHS ", "NVDIMM", 0x00000001)
 {
     Scope (\_SB)
     {
         Device (NVDR)
         {
             Name (_HID, "ACPI0012" /* NVDIMM Root Device */)  // _HID: Hardware ID
             Method (NCAL, 5, Serialized)
             {
                 Local6 = MEMA /* \MEMA */
                 {
                     Return (NCAL (Arg0, Arg1, Arg2, Arg3, 0x02))
                 }
             }

             Device (NV02)
             {
                 Name (_ADR, 0x03)  // _ADR: Address
                 Method (_DSM, 4, NotSerialized)  // _DSM: Device-Specific Method
                 {
                     Return (NCAL (Arg0, Arg1, Arg2, Arg3, 0x03))
                 }
             }
         }
     }

-    Name (MEMA, 0x43D10000)
+    Name (MEMA, 0x43F50000)
 }

Signed-off-by: Gerd Hoffmann <kraxel@redhat.com>
---
 pc-bios/edk2-i386-secure-code.fd.bz2 | Bin 1860546 -> 1473677 bytes
 1 file changed, 0 insertions(+), 0 deletions(-)

(limited to 'pc-bios/edk2-i386-secure-code.fd.bz2')

diff --git a/pc-bios/edk2-i386-secure-code.fd.bz2 b/pc-bios/edk2-i386-secure-code.fd.bz2
index b5df5bed30..a4b1cc92bd 100644
Binary files a/pc-bios/edk2-i386-secure-code.fd.bz2 and b/pc-bios/edk2-i386-secure-code.fd.bz2 differ
-- 
cgit v1.2.3

