From 7e0c47e1f6fb631d29a87bf4cc13cfda1552d8be Mon Sep 17 00:00:00 2001
From: Gregory Sanders <gsanders87@gmail.com>
Date: Tue, 17 Jan 2023 14:14:54 -0500
Subject: uiht

---
 bip-0174.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0174.mediawiki')

diff --git a/bip-0174.mediawiki b/bip-0174.mediawiki
index 0d260ee..a8f9ac8 100644
--- a/bip-0174.mediawiki
+++ b/bip-0174.mediawiki
@@ -410,7 +410,7 @@ The currently defined per-input types are defined as follows:
 | <tt>PSBT_IN_REQUIRED_HEIGHT_LOCKTIME = 0x12</tt>
 | None
 | No key data
-| <tt><32-bit uiht locktime></tt>
+| <tt><32-bit uint locktime></tt>
 | 32 bit unsigned little endian integer less than 500000000 representing the minimum block height that this input requires to be set as the transaction's lock time.
 |
 | 0
-- 
cgit v1.2.3

