From d16522949dbba2f3dc475f79f574814a4b3627f4 Mon Sep 17 00:00:00 2001
From: Dr Maxim Orlovsky <orlovsky@pandoracore.com>
Date: Thu, 6 Jan 2022 12:54:49 +0100
Subject: BIP-174: Remove PSBT_GLOBAL_SIGHASH_SINGLE_INPUT

---
 bip-0174.mediawiki | 11 -----------
 1 file changed, 11 deletions(-)

(limited to 'bip-0174.mediawiki')

diff --git a/bip-0174.mediawiki b/bip-0174.mediawiki
index 1afa7bb..295a9a3 100644
--- a/bip-0174.mediawiki
+++ b/bip-0174.mediawiki
@@ -171,17 +171,6 @@ The currently defined global types are as follows:
 | 2
 | [[bip-0370.mediawiki|370]]
 |-
-| SIGHASH_SINGLE Inputs
-| <tt>PSBT_GLOBAL_SIGHASH_SINGLE_INPUTS = 0x07</tt>
-| None
-| No key data
-| <tt><bit vector></tt>
-| A bit vector representing which input indexes use SIGHASH_SINGLE. If the bit for an index is set to 1, then the input and output pair at that index are tied together with SIGHASH_SINGLE and must be moved together.
-|
-| 0
-| 2
-| [[bip-0370.mediawiki|370]]
-|-
 | PSBT Version Number
 | <tt>PSBT_GLOBAL_VERSION = 0xFB</tt>
 | None
-- 
cgit v1.2.3

