From 469d62ce2b42b42e30e7e348e5c7666ed8f938de Mon Sep 17 00:00:00 2001
From: Jeremy Rubin <j@rubin.io>
Date: Sat, 8 Jan 2022 15:12:33 -0800
Subject: [BIP-174] Clarify that partial_sig should be a valid.

---
 bip-0174.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0174.mediawiki')

diff --git a/bip-0174.mediawiki b/bip-0174.mediawiki
index 295a9a3..55cb1a2 100644
--- a/bip-0174.mediawiki
+++ b/bip-0174.mediawiki
@@ -235,7 +235,7 @@ The currently defined per-input types are defined as follows:
 | <tt><pubkey></tt>
 | The public key which corresponds to this signature.
 | <tt><signature></tt>
-| The signature as would be pushed to the stack from a scriptSig or witness.
+| The signature as would be pushed to the stack from a scriptSig or witness. The signature should be a valid ECDSA signature corresponding to the pubkey that would return true when verified and not a value that would return false or be invalid otherwise (such as a NULLDUMMY).
 |
 |
 | 0, 2
-- 
cgit v1.2.3

