From aa206adf59483979fda5de30264c4017b2fcd8a5 Mon Sep 17 00:00:00 2001
From: Tobin Harding <me@tobin.cc>
Date: Tue, 17 Aug 2021 18:35:36 +1000
Subject: Remove newline to fix list rendering

Currently the newline in list items is causing the text on the new line
to be rendered as a code section. I am unsure why but I'm guessing
putting all the text for each list item on a single line will fix it.
---
 bip-0158.mediawiki | 6 ++----
 1 file changed, 2 insertions(+), 4 deletions(-)

(limited to 'bip-0158.mediawiki')

diff --git a/bip-0158.mediawiki b/bip-0158.mediawiki
index ce4a4af..1ac0c9c 100644
--- a/bip-0158.mediawiki
+++ b/bip-0158.mediawiki
@@ -273,10 +273,8 @@ This BIP defines one initial filter type:
 The basic filter is designed to contain everything that a light client needs to
 sync a regular Bitcoin wallet. A basic filter MUST contain exactly the
 following items for each transaction in a block:
-* The previous output script (the script being spent) for each input, except
-  for the coinbase transaction.
-* The scriptPubKey of each output, aside from all <code>OP_RETURN</code> output
-  scripts.
+* The previous output script (the script being spent) for each input, except for the coinbase transaction.
+* The scriptPubKey of each output, aside from all <code>OP_RETURN</code> output scripts.
 
 Any "nil" items MUST NOT be included into the final set of filter elements.
 
-- 
cgit v1.2.3

