From 724a688cf9bf7b46a119e5d3b0e5a7f17a3a9bdc Mon Sep 17 00:00:00 2001
From: Tobin Harding <me@tobin.cc>
Date: Tue, 17 Aug 2021 18:41:50 +1000
Subject: Fix grammar - remove 'was chosen as'

This sentence grammatically incorrect

 Empirical analysis also shows that was chosen as these parameters ...

Elect to fix the sentence to be:

 Empirical analysis also shows that these parameters ...
---
 bip-0158.mediawiki | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'bip-0158.mediawiki')

diff --git a/bip-0158.mediawiki b/bip-0158.mediawiki
index ce4a4af..484e674 100644
--- a/bip-0158.mediawiki
+++ b/bip-0158.mediawiki
@@ -299,9 +299,9 @@ one is able to select <code>P</code> and <code>M</code> independently, then
 setting <code>M=1.497137 * 2^P</code> is close to optimal
 <ref>https://gist.github.com/sipa/576d5f09c3b86c3b1b75598d799fc845</ref>.
 
-Empirical analysis also shows that was chosen as these parameters minimize the
-bandwidth utilized, considering both the expected number of blocks downloaded
-due to false positives and the size of the filters themselves.
+Empirical analysis also shows that these parameters minimize the bandwidth
+utilized, considering both the expected number of blocks downloaded due to false
+positives and the size of the filters themselves.
 
 The parameter <code>k</code> MUST be set to the first 16 bytes of the hash
 (in standard little-endian representation) of the block for which the filter is
-- 
cgit v1.2.3

