From 37d7e90eb70d7ad3b2b8a2b793721ddc94db181b Mon Sep 17 00:00:00 2001
From: shaolinfry <shaolinfry@protonmail.ch>
Date: Sat, 6 May 2017 18:11:34 +0000
Subject: BIP8: clarify deployment terms

---
 bip-0149.mediawiki | 12 ++++++++----
 1 file changed, 8 insertions(+), 4 deletions(-)

(limited to 'bip-0149.mediawiki')

diff --git a/bip-0149.mediawiki b/bip-0149.mediawiki
index 4d8fe82..c2a1853 100644
--- a/bip-0149.mediawiki
+++ b/bip-0149.mediawiki
@@ -22,6 +22,8 @@ Miners have been reluctant to signal the BIP9 segwit deployment despite a large
 
 ==Reference implementation==
 
+The reference implementation will refuse to run on Bitcoin mainnet before 7 November 2017, and can only be run on testnet and regtest until then.
+
 https://github.com/bitcoin/bitcoin/compare/master...shaolinfry:uasegwit-flagday
 
 ==Specification==
@@ -30,7 +32,9 @@ This deployment will set service bit (1<<5) as NODE_UAWITNESS.
 
 ==Deployment==
 
-This BIP will be deployed by BIP8 with the name "segwit" and using bit TBD.
+This BIP should only be deployed if BIP9-segwit fails to lock-in or activate before timeout on 15 November 2017. This BIP cannot be deployed before 15 November 2017.
+
+This BIP will be deployed by BIP8 with the name "segwit" and using bit 1.
 
 For Bitcoin mainnet, the BIP8 starttime will be midnight 16 November 2017 UTC (Epoch timestamp 1510790400) and BIP8 timeout will be 4 July 2018 UTC (Epoch timestamp 1530662400).
 
@@ -40,11 +44,11 @@ For Bitcoin testnet, segwit is already activated so no deployment is specified.
 
 This deployment reuses the GBT deployment name "segwit" to maintain compatibility with existing mining software.
 
-==Rationale==
+This deployment is incompatible with the BIP9-segwit deployment and should not be run concurrently with it.
 
-This BIP can be deployed well in advance of the BIP8 '''starttime''' so that the '''timeout''' will be sufficiently far in the future to allow Bitcoin users to upgrade in preparation.
+==Rationale==
 
-The '''starttime''' of this BIP is after the BIP9 "segwit" timeout to remove compatibility issues with old nodes.
+The '''starttime''' of this BIP is after the BIP9-segwit timeout to remove compatibility issues with old nodes.
 
 ==References==
 
-- 
cgit v1.2.3

