From cc67ae995c4df0b0e1040c34f8f68848954de35a Mon Sep 17 00:00:00 2001
From: shaolinfry <shaolinfry@users.noreply.github.com>
Date: Sat, 25 Mar 2017 03:59:43 +0000
Subject: Update code sample

---
 bip-0148.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0148.mediawiki')

diff --git a/bip-0148.mediawiki b/bip-0148.mediawiki
index 601682c..767c084 100644
--- a/bip-0148.mediawiki
+++ b/bip-0148.mediawiki
@@ -39,7 +39,7 @@ While this BIP is active, all blocks must set the nVersion header top 3 bits to
 <pre>
 // mandatory segwit activation between Oct 1st 2017 and Nov 15th 2017 inclusive
 if (pindex->GetMedianTimePast() >= 1506816000 && pindex->GetMedianTimePast() <= 1510704000 && !IsWitnessEnabled(pindex->pprev, chainparams.GetConsensus())) {
-    if (!((pindex->nVersion & VERSIONBITS_TOP_MASK) == VERSIONBITS_TOP_BITS) && (pindex->nVersion & VersionBitsMask(params, Consensus::DEPLOYMENT_SEGWIT)) != 0) {
+    if (!((pindex->nVersion & VERSIONBITS_TOP_MASK) == VERSIONBITS_TOP_BITS) && (pindex->nVersion & VersionBitsMask(chainparams.GetConsensus(), Consensus::DEPLOYMENT_SEGWIT)) != 0) {
         return state.DoS(0, error("ConnectBlock(): relayed block must signal for segwit, please upgrade"), REJECT_INVALID, "bad-no-segwit");
     }
 }
-- 
cgit v1.2.3

