From a6cc319846c4baaecbdd489dfc3143239189b4d5 Mon Sep 17 00:00:00 2001
From: Johnson Lau <jl2012@users.noreply.github.com>
Date: Tue, 5 Apr 2016 13:03:34 +0800
Subject: Update bip-0141.mediawiki

---
 bip-0141.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0141.mediawiki')

diff --git a/bip-0141.mediawiki b/bip-0141.mediawiki
index 09a5556..3cbcd13 100644
--- a/bip-0141.mediawiki
+++ b/bip-0141.mediawiki
@@ -118,7 +118,7 @@ Sigops in the current pubkey script, signature script, and P2SH check script are
 The sigop limit is likewise quadrupled to ≤ 80,000.
 
 In addition, opcodes within the witness program are counted identical to as previously within the P2SH check script.
-That is, CHECKSIG in a witness program is counted as only 1 sigop, and m-of-n CHECKMULTISIG in a witness program is counted as n sigop. This rule applies to both native witness program and P2SH witness program.
+That is, CHECKSIG in a witness program is counted as only 1 sigop, and CHECKMULTISIG in a witness program is counted as 1 to 20 sigops according to the arguments. This rule applies to both native witness program and P2SH witness program.
 
 == Examples ==
 
-- 
cgit v1.2.3

