From 64a7c45e84dbfcd6c36620f3e72258bf78b9d937 Mon Sep 17 00:00:00 2001
From: Thomas Kerin <afk11@users.noreply.github.com>
Date: Sun, 24 Jan 2016 17:21:17 +0000
Subject: typo

---
 bip-0141.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0141.mediawiki')

diff --git a/bip-0141.mediawiki b/bip-0141.mediawiki
index 7266e9d..1c8abc9 100644
--- a/bip-0141.mediawiki
+++ b/bip-0141.mediawiki
@@ -92,7 +92,7 @@ The new rule is total ''block cost'' ≤ 4,000,000.
 
 Sigops per block is currently limited to 20,000. We change this restriction as follows:
 
-''Sigop cost'' is defined. The cost of a sigop in traditoinal script is 4, while the cost of a sigop in witness program is 1.
+''Sigop cost'' is defined. The cost of a sigop in traditional script is 4, while the cost of a sigop in witness program is 1.
 
 The new rule is total ''sigop cost'' ≤ 80,000.
 
-- 
cgit v1.2.3

