From a200aed81d466e62f2bc2ad3c3fec31002050262 Mon Sep 17 00:00:00 2001
From: D++ <82842780+dplusplus1024@users.noreply.github.com>
Date: Mon, 11 Apr 2022 04:32:12 -0400
Subject: Grammar update

---
 bip-0125.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0125.mediawiki')

diff --git a/bip-0125.mediawiki b/bip-0125.mediawiki
index e43ddb1..8cd7649 100644
--- a/bip-0125.mediawiki
+++ b/bip-0125.mediawiki
@@ -132,7 +132,7 @@ confirmed, and so some users advocated that replacement should be
 disallowed.
 
 To address those concerns, a variation on RBF was created that
-required that the replacement transaction pay all of same outputs as
+required that the replacement transaction pay all of the same outputs as
 the original transaction in equal or greater amount.  This was called
 RBF First Seen Safe (RBF-FSS), and the original RBF became known as
 full-RBF.  Although agreeable to recipients who relied on the
-- 
cgit v1.2.3

