From 3e85c85044915402b302605596831073f8e07318 Mon Sep 17 00:00:00 2001
From: Richard Kiss <him@richardkiss.com>
Date: Sat, 1 Feb 2020 12:25:27 -0800
Subject: Update bip-0119.mediawiki

Fix typo.
---
 bip-0119.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0119.mediawiki')

diff --git a/bip-0119.mediawiki b/bip-0119.mediawiki
index 11a90bb..fa1ba4d 100644
--- a/bip-0119.mediawiki
+++ b/bip-0119.mediawiki
@@ -100,7 +100,7 @@ In BOLT #2, this maximum number of HTLCs in a channel is hard limited to 483 as
 size to prevent the transaction from being too large to be valid. In common software implementations
 such as LND, this limit is set much lower to 12 HTLCS. This is because accepting a larger number of
 HTLCS makes it more difficult for transactions to confirm during congested periods as they must pay
-hire fees.
+higher fees.
 Therefore, similarly to how congestion control is handled for normal transaction, lightning channel
 updates can be done across an CHECKTEMPLATEVERIFY tree, allowing nodes to safely use many more
 HTLCS.
-- 
cgit v1.2.3

