From 2f1e2bc4d8ea0da70b7e840875292b0a5df8228e Mon Sep 17 00:00:00 2001
From: sgmoore <git-sgmoore@users.noreply.github.com>
Date: Tue, 15 Aug 2023 12:54:34 -0700
Subject: added colon at end of if statement - bip-0119.mediawiki

Python requires a colon at the end of an if statement to denote the beginning of the block of code that will be executed if the condition is True. If the colon is omitted, a syntax error will occur, and the code will not run. Since the syntax error will prevent the code from running, it won't introduce any vulnerabilities by itself. However, it will cause the application to fail at the point where the code is parsed, which might expose other issues if error handling is not implemented properly.
---
 bip-0119.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0119.mediawiki')

diff --git a/bip-0119.mediawiki b/bip-0119.mediawiki
index 86defa7..9955400 100644
--- a/bip-0119.mediawiki
+++ b/bip-0119.mediawiki
@@ -88,7 +88,7 @@ def execute_bip_119(self):
             self.context.precomputed_ctv_data = self.context.tx.get_default_check_template_precomputed_data()
 
         # If the hashes do not match, return error
-        if stack[-1] != self.context.tx.get_default_check_template_hash(self.context.nIn, self.context.precomputed_ctv_data)
+        if stack[-1] != self.context.tx.get_default_check_template_hash(self.context.nIn, self.context.precomputed_ctv_data):
             return self.errors_with(errors.script_err_template_mismatch)
 
         return self.return_as_nop()
-- 
cgit v1.2.3

