From fba4c80b9f36f5648f2156265a10cff017f5fc2f Mon Sep 17 00:00:00 2001
From: flack <flack@contentcontrol-berlin.de>
Date: Thu, 5 Oct 2017 23:43:18 +0200
Subject: Typo fix

---
 bip-0115.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0115.mediawiki')

diff --git a/bip-0115.mediawiki b/bip-0115.mediawiki
index 52366ab..9432f5c 100644
--- a/bip-0115.mediawiki
+++ b/bip-0115.mediawiki
@@ -83,7 +83,7 @@ Why are block heights required to be absolute, rather than relative?
 Why are blocks older than 52596 deep in the chain not verified?
 
 * This is to avoid creating an infinite storage requirement from all full nodes which would be necessary to maintain all the block headers indefinitely. 52596 block headers requires a fixed size of approximately 4 MB.
-* In any case where you might want to specify a deeper block, you can also just as well specify a more recent one that decends from it.
+* In any case where you might want to specify a deeper block, you can also just as well specify a more recent one that descends from it.
 * It is assumed that 1 year is sufficient time to double-spend any common UTXOs on all blockchains of interest.
 * If a deeper check is needed, it can be softforked in. Making the check more shallow, on the other hand, is a hardfork.
 
-- 
cgit v1.2.3

