From b027b77ed969fe27e3a7808742173a77d105e991 Mon Sep 17 00:00:00 2001
From: Mark Friedenbach <mark@friedenbach.org>
Date: Mon, 5 Oct 2015 16:53:44 -0700
Subject: Change reference git repo to the associated pull request.

---
 bip-0113.mediawiki | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'bip-0113.mediawiki')

diff --git a/bip-0113.mediawiki b/bip-0113.mediawiki
index b7313e3..59bee84 100644
--- a/bip-0113.mediawiki
+++ b/bip-0113.mediawiki
@@ -64,10 +64,10 @@ parameter. This BIP proposes that after activation calls to
 IsFinalTx() or LockTime() within consensus code use the return value
 of `GetMedianTimePast(pindexPrev)` instead.
 
-A reference implementation of this proposal is provided in the
-following git repository:
+A reference implementation of this proposal is provided by the
+following pull request:
 
-https://github.com/maaku/bitcoin/tree/medianpasttimelock
+https://github.com/bitcoin/bitcoin/pull/6566
 
 
 ==Deployment==
-- 
cgit v1.2.3

