From 506f959ffe87cb32fc6b642aae5c5a24b2fb9c82 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?=E0=B8=BFtcDrak?= <btcdrak@users.noreply.github.com>
Date: Tue, 3 Nov 2015 10:24:28 +0000
Subject: Add clarification about upper bounds.

---
 bip-0105.mediawiki | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'bip-0105.mediawiki')

diff --git a/bip-0105.mediawiki b/bip-0105.mediawiki
index cbd309d..c4f0a09 100644
--- a/bip-0105.mediawiki
+++ b/bip-0105.mediawiki
@@ -88,7 +88,8 @@ the next 2016 blocks.
 Blocks that are larger than the calculated base block size limit are invalid and
 will be rejected.
 
-The base block size limit may not reduce below 1MB or increase above 8MB.
+The base block size limit may not reduce below 1MB or increase above 8MB (the exact
+number for the upper limit requires further discussion).
 
 
 ==Acknowledgements==
-- 
cgit v1.2.3

