From 6cbc562fcd21bb52a04855a5276dc7ac5e85d923 Mon Sep 17 00:00:00 2001
From: James Hilliard <james.hilliard1@gmail.com>
Date: Sun, 16 Jul 2017 23:09:20 +0200
Subject: Update BIP91 reference implementation repository

---
 bip-0091.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0091.mediawiki')

diff --git a/bip-0091.mediawiki b/bip-0091.mediawiki
index 93161e0..3cd25d5 100644
--- a/bip-0091.mediawiki
+++ b/bip-0091.mediawiki
@@ -86,7 +86,7 @@ if (VersionBitsState(pindex->pprev, chainparams.GetConsensus(), Consensus::DEPLO
 }
 </pre>
 
-https://github.com/bitcoin/bitcoin/compare/0.14...jameshilliard:segsignal-v0.14.1
+https://github.com/segsignal/bitcoin
 
 ==Backwards Compatibility==
 
-- 
cgit v1.2.3

