From 6ab609e01f84bc8a43da70e7e0ca8234e02c2d21 Mon Sep 17 00:00:00 2001
From: James Hilliard <james.hilliard1@gmail.com>
Date: Fri, 16 Jun 2017 02:00:43 -0500
Subject: Clarify when BIP91 will cease to be active

---
 bip-0091.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0091.mediawiki')

diff --git a/bip-0091.mediawiki b/bip-0091.mediawiki
index 31d07c6..93161e0 100644
--- a/bip-0091.mediawiki
+++ b/bip-0091.mediawiki
@@ -34,7 +34,7 @@ While this BIP is active, all blocks must set the nVersion header top 3 bits to
 
 This BIP will be deployed by a "version bits" with an 80%(this can be adjusted if desired) 269 block activation threshold and 336 block confirmation window BIP9 with the name "segsignal" and using bit 4.
 
-This BIP will have a start time of midnight June 1st, 2017 (epoch time 1496275200) and timeout on midnight November 15th 2017 (epoch time 1510704000). This BIP will cease to be active when segwit is locked-in.
+This BIP will have a start time of midnight June 1st, 2017 (epoch time 1496275200) and timeout on midnight November 15th 2017 (epoch time 1510704000). This BIP will cease to be active when segwit (BIP141) is locked-in, active, or failed
 
 === Reference implementation ===
 
-- 
cgit v1.2.3

