From 2e98c7115cb524037300180560f5c399edb6883c Mon Sep 17 00:00:00 2001
From: Aneesh Karve <aneesh.karve@gmail.com>
Date: Sun, 13 Oct 2024 17:02:11 -0700
Subject: BIP-85: Correct bad test vector for Base64

---
 bip-0085.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0085.mediawiki')

diff --git a/bip-0085.mediawiki b/bip-0085.mediawiki
index 633210c..ff5b16f 100644
--- a/bip-0085.mediawiki
+++ b/bip-0085.mediawiki
@@ -285,7 +285,7 @@ INPUT:
 * PATH: m/83696968'/707764'/21'/0'
 
 OUTPUT
-* DERIVED ENTROPY=d7ad61d4a76575c5bad773feeb40299490b224e8e5df6c8ad8fe3d0a6eed7b85ead9fef7bcca8160f0ee48dc6e92b311fc71f2146623cc6952c03ce82c7b63fe
+* DERIVED ENTROPY=74a2e87a9ba0cdd549bdd2f9ea880d554c6c355b08ed25088cfa88f3f1c4f74632b652fd4a8f5fda43074c6f6964a3753b08bb5210c8f5e75c07a4c2a20bf6e9
 * DERIVED PWD=dKLoepugzdVJvdL56ogNV
 
 ===PWD BASE85===
-- 
cgit v1.2.3

