From c912e616d383d3ebae9d3a2932d5fd193978ff9d Mon Sep 17 00:00:00 2001
From: Peter Todd <pete@petertodd.org>
Date: Fri, 13 Nov 2015 12:19:53 -0500
Subject: Clearer wording

---
 bip-0065.mediawiki | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'bip-0065.mediawiki')

diff --git a/bip-0065.mediawiki b/bip-0065.mediawiki
index 6563010..6163b90 100644
--- a/bip-0065.mediawiki
+++ b/bip-0065.mediawiki
@@ -18,8 +18,8 @@ some point in the future.
 
 CHECKLOCKTIMEVERIFY redefines the existing NOP2 opcode. When executed it
 compares the top item on the stack to the nLockTime field of the transaction
-containing the scriptSig. If that top stack item is greater than the transaction
-nLockTime the script fails immediately, otherwise script evaluation continues
+containing the scriptSig. If that top stack item is greater than the transaction's
+nLockTime field the script fails immediately, otherwise script evaluation continues
 as though a NOP was executed.
 
 The nLockTime field in a transaction prevents the transaction from being mined
-- 
cgit v1.2.3

