From abc7ae83a0ae3f31e83bf7933bcf26ed4f6b529d Mon Sep 17 00:00:00 2001
From: jl2012 <jl2012@users.noreply.github.com>
Date: Wed, 9 Dec 2015 00:37:25 +0800
Subject: Update bip-0065.mediawiki

the nLockTime feature may still be active as other inputs may not be final
---
 bip-0065.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0065.mediawiki')

diff --git a/bip-0065.mediawiki b/bip-0065.mediawiki
index a90be62..84bad65 100644
--- a/bip-0065.mediawiki
+++ b/bip-0065.mediawiki
@@ -24,7 +24,7 @@ with an error:
 * the top item on the stack is less than 0; or
 * the lock-time type (height vs. timestamp) of the top stack item and the nLockTime field are not the same; or
 * the top stack item is greater than the transaction's nLockTime field; or
-* the nLockTime feature is disabled by setting the nSequence field of the txin to 0xffffffff;
+* the nSequence field of the txin is 0xffffffff;
 
 Otherwise, script execution will continue as if a NOP had been executed.
 
-- 
cgit v1.2.3

