From 004be2e8225d582fa1bfd27f08b856996c981586 Mon Sep 17 00:00:00 2001
From: jl2012 <jl2012@users.noreply.github.com>
Date: Sun, 6 Dec 2015 23:52:42 +0800
Subject: Update bip-0065.mediawiki

---
 bip-0065.mediawiki | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'bip-0065.mediawiki')

diff --git a/bip-0065.mediawiki b/bip-0065.mediawiki
index a960e54..a90be62 100644
--- a/bip-0065.mediawiki
+++ b/bip-0065.mediawiki
@@ -20,9 +20,9 @@ CHECKLOCKTIMEVERIFY redefines the existing NOP2 opcode. When executed, if
 any of the following conditions are true, the script interpreter will terminate
 with an error:
 
-* the stake is empty; or
+* the stack is empty; or
 * the top item on the stack is less than 0; or
-* the lock-time type (height vs. timestamp) of the top stake item and the nLockTime field are not the same; or
+* the lock-time type (height vs. timestamp) of the top stack item and the nLockTime field are not the same; or
 * the top stack item is greater than the transaction's nLockTime field; or
 * the nLockTime feature is disabled by setting the nSequence field of the txin to 0xffffffff;
 
-- 
cgit v1.2.3

