From 4cd13bf62d965342cd82f9388e3506361a88e150 Mon Sep 17 00:00:00 2001
From: Douglas Roark <doug@bitcoinarmory.com>
Date: Mon, 9 Feb 2015 00:02:35 -0500
Subject: Fix broken source code link.

---
 bip-0062.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0062.mediawiki')

diff --git a/bip-0062.mediawiki b/bip-0062.mediawiki
index 4e5653b..99ff605 100644
--- a/bip-0062.mediawiki
+++ b/bip-0062.mediawiki
@@ -63,7 +63,7 @@ Below is a summary of the effects on signatures, their encoding and data pushes.
 
 The value S in signatures must be between 0x1 and 0x7FFFFFFF FFFFFFFF FFFFFFFF FFFFFFFF 5D576E73 57A4501D DFE92F46 681B20A0 (inclusive). If S is too high, simply replace it by S' = 0xFFFFFFFF FFFFFFFF FFFFFFFF FFFFFFFE BAAEDCE6 AF48A03B BFD25E8C D0364141 - S.
 
-Signatures produced by the OpenSSL library are not guaranteed to be consistent with this constraint. Version 0.9.3 of the reference client provides [https://github.com/bitcoin/bitcoin/blob/0.9.3/src/key.cpp#L202-L227 an example] for detection and correction.
+Signatures produced by the OpenSSL library are not guaranteed to be consistent with this constraint. Version 0.9.3 of the reference client provides [https://github.com/bitcoin/bitcoin/blob/v0.9.3/src/key.cpp#L202-L227 an example] for detection and correction.
 
 The constraints on the value R are unchanged w.r.t. ECDSA, and values can be between 0x1 and 0xFFFFFFFF FFFFFFFF FFFFFFFF FFFFFFFE BAAEDCE6 AF48A03B BFD25E8C D0364140 (inclusive).
 
-- 
cgit v1.2.3

