From fecbe1f8a8d9f424a23aea6d0d0958af7f674b15 Mon Sep 17 00:00:00 2001
From: PoWx Team <dev@powx.org>
Date: Thu, 16 Dec 2021 09:56:17 +0100
Subject: BIP 52: Fix syntax

---
 bip-0052.mediawiki | 1 -
 1 file changed, 1 deletion(-)

(limited to 'bip-0052.mediawiki')

diff --git a/bip-0052.mediawiki b/bip-0052.mediawiki
index c6ac5d2..9d5cff0 100644
--- a/bip-0052.mediawiki
+++ b/bip-0052.mediawiki
@@ -4,7 +4,6 @@
   Title: Durable, Low Energy Bitcoin PoW
   Author: Michael Dubrovsky <mike+bip@powx.org>
           Bogdan Penkovsky <bogdan+bip@powx.org>
-  Discussions-To:
   Comments-Summary: No comments yet.
   Comments-URI: https://github.com/bitcoin/bips/wiki/Comments:BIP-0052
   Status: Draft
-- 
cgit v1.2.3

