From cc636e6f83d8276df3823a66a8e790224b0ba1fb Mon Sep 17 00:00:00 2001
From: PoWx Team <dev@powx.org>
Date: Wed, 15 Dec 2021 23:25:01 +0100
Subject: Fix Malformed Author line

---
 bip-0052.mediawiki | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'bip-0052.mediawiki')

diff --git a/bip-0052.mediawiki b/bip-0052.mediawiki
index 051f2b6..5debadd 100644
--- a/bip-0052.mediawiki
+++ b/bip-0052.mediawiki
@@ -1,9 +1,9 @@
 <pre>
   BIP: 52
   Title: Durable, Low Energy Bitcoin PoW
-  Author: Michael Dubrovsky <mike+bip[at]powx.org>
-          Bogdan Penkovsky <bogdan+bip[at]powx.org>
-  Discussions-To: <mike+bip[at]powx.org>
+  Author: Michael Dubrovsky <mike+bip@powx.org>
+          Bogdan Penkovsky <bogdan+bip@powx.org>
+  Discussions-To: <mike+bip@powx.org>
   Comments-Summary: No comments yet.
   Comments-URI: https://github.com/PoWx-Org/obtc/wiki/BIP
   Status: Draft
-- 
cgit v1.2.3

