From 9bb5acaec764b41c23d5d4364bc2d5bba87910d4 Mon Sep 17 00:00:00 2001
From: Thomas Kerin <afk11@users.noreply.github.com>
Date: Tue, 9 Feb 2016 18:52:38 +0000
Subject: Typo

---
 bip-0050.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0050.mediawiki')

diff --git a/bip-0050.mediawiki b/bip-0050.mediawiki
index 3107070..dbec7aa 100644
--- a/bip-0050.mediawiki
+++ b/bip-0050.mediawiki
@@ -41,7 +41,7 @@ This would be an issue even if the entire network was running version 0.7.2. It
 ===Immediately===
 
 '''Done''': Release a version 0.8.1, forked directly from 0.8.0, that, for the next two months has the following new rules:
-# Reject blocks that would probably could cause more than 10,000 locks to be taken.
+# Reject blocks that would probably cause more than 10,000 locks to be taken.
 # Limit the maximum block-size created to 500,000 bytes
 # Release a patch for older versions that implements the same rules, but also increases the maximum number of locks to 537,000
 # Create a web page on bitcoin.org that will urge users to upgrade to 0.8.1, but will tell them how to set DB_CONFIG to 537,000 locks if they absolutely cannot.
-- 
cgit v1.2.3

