From 49d44b9b287f164c5b55718abe90620ddb8778d3 Mon Sep 17 00:00:00 2001
From: Torkel Rogstad <torkel@rogstad.io>
Date: Tue, 30 Apr 2019 10:51:43 +0200
Subject: Update bip-0049.mediawiki

Fix broken internal link
---
 bip-0049.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0049.mediawiki')

diff --git a/bip-0049.mediawiki b/bip-0049.mediawiki
index 74645a1..4551b31 100644
--- a/bip-0049.mediawiki
+++ b/bip-0049.mediawiki
@@ -68,7 +68,7 @@ To derive the P2SH address from the above calculated public key, we use the enca
 
 ==Backwards Compatibility==
 
-This BIP is not backwards compatible by design as described under [#considerations]. An incompatible wallet will not discover accounts at all and the user will notice that something is wrong.
+This BIP is not backwards compatible by design as described under [[#considerations|considerations]]. An incompatible wallet will not discover accounts at all and the user will notice that something is wrong.
 
 
 ==Test vectors==
-- 
cgit v1.2.3

