From 433283d671482f4f8467168e46cf44c4fe105691 Mon Sep 17 00:00:00 2001
From: kaidiren <kaidiren@gmail.com>
Date: Fri, 28 Sep 2018 15:15:03 +0800
Subject: fix bip-0016 link 404

---
 bip-0016/qa.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0016/qa.mediawiki')

diff --git a/bip-0016/qa.mediawiki b/bip-0016/qa.mediawiki
index 6a8a08d..1edf28e 100644
--- a/bip-0016/qa.mediawiki
+++ b/bip-0016/qa.mediawiki
@@ -1,4 +1,4 @@
-This page is a Quality Assurance test plan for [[BIP 16]].  If you see a test missing, please add it.
+This page is a Quality Assurance test plan for [[../bip-0016.mediawiki|BIP 16]].  If you see a test missing, please add it.
 If you can help test, please edit this page to sign-off on it.
 
 {| class="wikitable"
-- 
cgit v1.2.3

