From 14973bcb0956614c08b561f844a0b3746fdf5e4b Mon Sep 17 00:00:00 2001
From: shaolinfry <shaolinfry@protonmail.ch>
Date: Tue, 25 Apr 2017 18:56:21 +0530
Subject: Bug fix

---
 bip-0008.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0008.mediawiki')

diff --git a/bip-0008.mediawiki b/bip-0008.mediawiki
index b5e46a6..3a1f207 100644
--- a/bip-0008.mediawiki
+++ b/bip-0008.mediawiki
@@ -23,7 +23,7 @@ This specification provides a way to optionally guarantee lock-in at the end of
 
 ==Specification==
 
-This specification is the same as [[bip-0009.mediawiki|BIP9]] except there is no FAILED condition. The state transition from '''STARTED''' to '''LOCKED_IN''' will occur under two condition:
+This specification is the same as [[bip-0009.mediawiki|BIP9]] except from the STARTED state, there is no FAILED condition. The state transition from '''STARTED''' to '''LOCKED_IN''' will occur under two condition:
 
 The first is when the threshold  of blocks signalling is reached as per BIP9. The second is if the timeout is still '''STARTED'''.
 
-- 
cgit v1.2.3

