From fc352d54e825c04527d5573bed90fb8a3463fe2f Mon Sep 17 00:00:00 2001
From: Luke Dashjr <luke-jr+git@utopios.org>
Date: Fri, 5 Feb 2016 01:06:08 +0000
Subject: bip-0002: Be more explicit on the need for review to primarily occur
 on the ML during drafting

---
 bip-0002.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0002.mediawiki')

diff --git a/bip-0002.mediawiki b/bip-0002.mediawiki
index 2558f20..571361c 100644
--- a/bip-0002.mediawiki
+++ b/bip-0002.mediawiki
@@ -98,7 +98,7 @@ Reviewers of the BIP who consider themselves qualified, should post their own co
 The comments page should generally only be used to post final comments for a completed BIP.
 If a BIP is not yet completed, reviewers should instead post on the applicable development mailing list thread to allow the BIP author(s) to address any concerns or problems pointed out by the review.
 
-Some BIPs receive exposure outside the development community prior to completion, and other BIPs might not be completed at all. To avoid a situation where critical BIP reviews may go unnoticed during this period, reviewers may, at their option, still cross-post their review on the comments page, provided they plan to review any new versions and remove or revise their comments as applicable. Such revisions should be made by editing the previous review and updating the timestamp. Reviews made prior to the complete version may be removed if they are no longer applicable and have not been updated in a timely manner (eg, within one month).
+Some BIPs receive exposure outside the development community prior to completion, and other BIPs might not be completed at all. To avoid a situation where critical BIP reviews may go unnoticed during this period, reviewers may, at their option, still post their review on the comments page, provided they first post it to the mailing list and plan to later remove or revise it as applicable based on the completed version. Such revisions should be made by editing the previous review and updating the timestamp. Reviews made prior to the complete version may be removed if they are no longer applicable and have not been updated in a timely manner (eg, within one month).
 
 Pages must be named after the full BIP number (eg, "BIP 0001") and placed in the "BIP Comments" namespace. For example, the link for BIP 1 will be https://en.bitcoin.it/wiki/BIP_Comments:BIP_0001 .
 
-- 
cgit v1.2.3

