From 4ce983bee9efb184f8c126d9f099dc2cae99500a Mon Sep 17 00:00:00 2001
From: MarcoFalke <falke.marco@gmail.com>
Date: Wed, 5 Oct 2016 14:56:44 +0200
Subject: BIP2: Remove Superseded from choices for Status

The section about the BIP status field only defines
"Replaced or Obsolete (which is equivalent to Replaced)",
so remove "Superseded" for clarity.
---
 bip-0002.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'bip-0002.mediawiki')

diff --git a/bip-0002.mediawiki b/bip-0002.mediawiki
index 64eaf36..8c745c8 100644
--- a/bip-0002.mediawiki
+++ b/bip-0002.mediawiki
@@ -126,7 +126,7 @@ Each BIP must begin with an RFC 822 style header preamble. The headers must appe
 * Comments-Summary: <summary tone>
   Comments-URI: <links to wiki page for comments>
   Status: <Draft | Active | Proposed | Deferred | Rejected |
-           Withdrawn | Final | Superseded>
+           Withdrawn | Final | Replaced>
   Type: <Standards Track | Informational | Process>
   Created: <date created on, in ISO 8601 (yyyy-mm-dd) format>
   License: <abbreviation for approved license(s)>
-- 
cgit v1.2.3

