From 806b8b886fef460a7a812c219f30d5b09d74d2d0 Mon Sep 17 00:00:00 2001
From: Ava Chow <github@achow101.com>
Date: Mon, 15 Jan 2024 14:07:56 -0500
Subject: BIP 373: add MuSig2 PSBT Fields BIP

---
 README.mediawiki | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
index 3d4f259..91f7c4c 100644
--- a/README.mediawiki
+++ b/README.mediawiki
@@ -1149,6 +1149,13 @@ Those proposing changes should consider that ultimately consent may rest with th
 | Standard
 | Draft
 |-
+| [[bip-0373.mediawiki|373]]
+| Applications
+| MuSig2 PSBT Fields
+| Ava Chow
+| Standard
+| Draft
+|-
 | [[bip-0380.mediawiki|380]]
 | Applications
 | Output Script Descriptors General Operation
-- 
cgit v1.2.3

