From 3a287681a42a334ea5f0cfbbed734074d533bed9 Mon Sep 17 00:00:00 2001
From: PoWx Team <dev@powx.org>
Date: Wed, 15 Dec 2021 23:40:19 +0100
Subject: BIP 52: Trying to fix CI errors

---
 README.mediawiki | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'README.mediawiki')

diff --git a/README.mediawiki b/README.mediawiki
index b3c2f97..3e1454c 100644
--- a/README.mediawiki
+++ b/README.mediawiki
@@ -274,7 +274,7 @@ Those proposing changes should consider that ultimately consent may rest with th
 | Final
 |-
 | [[bip-0052.mediawiki|52]]
-| Consensus (hard fork)
+|
 | Durable, Low Energy Bitcoin PoW
 | Michael Dubrovsky, Bogdan Penkovsky
 | Standard
-- 
cgit v1.2.3

